-- Add AI provider settings to settings table
-- API keys remain in environment variables for security

INSERT INTO settings (key, value, description, updated_at)
VALUES
  ('ai_provider', 'claude', 'AI provider for content generation (claude or openai)', NOW()),
  ('ai_model', '', 'AI model to use (leave blank for default: gpt-4o for openai, claude-sonnet-4-20250514 for claude)', NOW())
ON CONFLICT (key) DO NOTHING;
